14 16 18

-1000

-800

-600

-400

-200 0

Temperature (C)

Depth (m)

38 38.2 38.4 38.6

-1000

-800

-600

-400

-200 0

Salinity (PSU)

38 38.2 38.4 38.6 14 15 16 17 18 19

Salinity (PSU)

Temperature (C)

27.5 28 28.5 29

-1000

-800

-600

-400

-200 0

Potential Density (kg/m^3)

Alliance 7-10 May CTD data, Channel Domain

0.01 0.02 0.03 0.04 0.05

-600

-400

-200

Potential Density Shear (kg/m^4)