(a)

(b)

Fig. 23. Multivariate a posteriori error standard deviations (St.Dv.) for Case 2: the square root of the diagonal of Ea�aEa T (App. A.3) is illustrated. (a): surface (5 m) error St.Dv. of four PE fields. (b): ψ error St.Dv., bv error St.Dv. at 410 m, and bu and bv error St.Dv. at 1500 m.