Fig. 8. Subbasin-scale (w = 1) temperature and salinity fields, at 5, 105, 225 and 500 m, as estimated by a multivariate 3D error subspace analysis. The dominant 500 vectors of Btrc are used (eq. A16). Scalings and levels shown are as on Fig. 5.