Fig. 11. Mesoscale (w = 2) temperature and salinity fields, at 5, 105, 225 and 500 m, as estimated by univariate two-dimensional HOPS analyses. The a priori estimate x^b_{trc} in this second-stage is the subbasinscale analysis of the first-stage (w = 1) shown on Fig. 5. For temperature, the scaling at 5 and 105 m is as on Fig. 5, but at 225 and 500 m, it differs. For salinity, the scaling is uniform, as on Fig. 5.