(a)

(b)

Fig. 15. (a): coordinates of the 247 CTD profiles gathered during March 19–April 16, 236 of which are in the domain and form y^o (App. A) in the mesoscale field mappings. (b): surface (5 m) values of the a posteriori mesoscale error variance for temperature, as estimated by the univariate 2D scheme. Errors are normalized (0–1) and computed using a Mexican hat for a priori covariance function (l^x_a = l^y_a = 60 km and l^x_b = l^y_b = 30 km) and an a priori variance of uniform amplitude equal to 1.