(a) Temperature forecast 21 Mar. 1998 (b) Chlorophyll forecast 21 Mar. 1998

(c) Temperature forecast error (100m) (d) Adaptively designed sampling

(e) SST from AVHRR 17 Mar. 1998 (f) Chlorophyll from SeaWiFS 18 Mar. 1998